-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.66


######### Lightcurve features #########

amplitude  =  0.290662262252
cusum  =  0.169257503442
eta  =  1.36388206888
hl_amp_ratio  =  1.67750657692
kurtosis  =  -1.19181677869
n_points  =  62
period  =  0.581117257111
period_SNR  =  14.3952109801
period_log10FAP  =  -3.15462124769
period_uncertainty  =  0.000179665263064
phase_cusum  =  0.355718492326
phase_eta  =  0.309563204828
phi21  =  -2.08188971648
phi31  =  -3.73375463476
quartile31  =  0.4875
r21  =  0.490348615427
r31  =  0.158628343702
shapiro_w  =  0.944650828838
skewness  =  0.198896085277
slope_per10  =  -0.300293683876
slope_per90  =  0.411373961072
stetson_k  =  0.836362668048
weighted_mean  =  16.2376185224
weighted_std  =  0.28882983485
