-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.28


######### Lightcurve features #########

amplitude  =  0.215856041996
cusum  =  0.0851663642388
eta  =  1.72234152315
hl_amp_ratio  =  1.69384556131
kurtosis  =  0.143948253625
n_points  =  161
period  =  0.0837584877646
period_SNR  =  10.5879953042
period_log10FAP  =  -0.832815053513
period_uncertainty  =  1.62669426677e-06
phase_cusum  =  0.220144245773
phase_eta  =  1.3998753669
phi21  =  -2.45506693756
phi31  =  -3.57654959199
quartile31  =  0.45
r21  =  0.15045354802
r31  =  0.221773739955
shapiro_w  =  0.960065722466
skewness  =  0.680564014427
slope_per10  =  -0.00908751443264
slope_per90  =  0.00862826884737
stetson_k  =  0.761432369961
weighted_mean  =  11.5940993789
weighted_std  =  0.367730106352
