-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.391731620193
cusum  =  0.123044460915
eta  =  0.567157529785
hl_amp_ratio  =  0.268554870472
kurtosis  =  0.0948496042652
n_points  =  205
period  =  0.561741
period_SNR  =  25.5938272627
period_log10FAP  =  -20.0663792721
period_uncertainty  =  0.000108514041396
phase_cusum  =  0.25998856541
phase_eta  =  0.520740206174
phi21  =  0.561822377995
phi31  =  1.72515834023
quartile31  =  0.48
r21  =  0.501254846252
r31  =  0.140646267653
shapiro_w  =  0.859128117561
skewness  =  -1.08756586682
slope_per10  =  -0.0620799981524
slope_per90  =  0.227199956853
stetson_k  =  0.661857583988
weighted_mean  =  13.069403188
weighted_std  =  0.407900344559
