-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.270654529103
cusum  =  0.10519325737
eta  =  0.487683814182
hl_amp_ratio  =  0.383892266249
kurtosis  =  -0.851162150291
n_points  =  555
period  =  0.637200442373
period_SNR  =  63.7015666523
period_log10FAP  =  -79.2059033295
period_uncertainty  =  0.000110794349156
phase_cusum  =  0.242549997016
phase_eta  =  0.212189139009
phi21  =  0.806338577895
phi31  =  1.88154885562
quartile31  =  0.38
r21  =  0.415134329692
r31  =  0.254925614395
shapiro_w  =  0.912676513195
skewness  =  -0.577889336544
slope_per10  =  -0.0816101615134
slope_per90  =  0.139159323888
stetson_k  =  0.771450832005
weighted_mean  =  13.8907265917
weighted_std  =  0.234616836674
