-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.259168317266
cusum  =  0.120400144787
eta  =  0.538535233499
hl_amp_ratio  =  0.701380098029
kurtosis  =  -0.272255389721
n_points  =  316
period  =  0.552194594342
period_SNR  =  41.3506063726
period_log10FAP  =  -40.4132734393
period_uncertainty  =  0.000103226809628
phase_cusum  =  0.25174967781
phase_eta  =  0.154373155908
phi21  =  -2.14782468042
phi31  =  -1.04429658483
quartile31  =  0.33
r21  =  0.443427131618
r31  =  0.303702247163
shapiro_w  =  0.957850158215
skewness  =  -0.537563531406
slope_per10  =  -0.131391051608
slope_per90  =  0.160073821094
stetson_k  =  0.807279344945
weighted_mean  =  16.040683779
weighted_std  =  0.206560345538
