-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.69


######### Lightcurve features #########

amplitude  =  0.368442813091
cusum  =  0.144822765599
eta  =  0.529099678401
hl_amp_ratio  =  0.512755589698
kurtosis  =  -0.915279437113
n_points  =  329
period  =  0.789283077055
period_SNR  =  40.9780177931
period_log10FAP  =  -43.7802231279
period_uncertainty  =  0.000169869815805
phase_cusum  =  0.30527667044
phase_eta  =  0.105505442881
phi21  =  0.791001675469
phi31  =  1.60252687529
quartile31  =  0.51
r21  =  0.361101863629
r31  =  0.250876942794
shapiro_w  =  0.899902105331
skewness  =  -0.590437259252
slope_per10  =  -0.213933332513
slope_per90  =  0.391899985261
stetson_k  =  0.804791474401
weighted_mean  =  14.2467130741
weighted_std  =  0.311978439534
