-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.324835680093
cusum  =  0.0866954179603
eta  =  0.550020196023
hl_amp_ratio  =  0.451248455213
kurtosis  =  -0.776011584306
n_points  =  354
period  =  0.6034210981
period_SNR  =  39.06534876
period_log10FAP  =  -44.0163734847
period_uncertainty  =  0.000100953810197
phase_cusum  =  0.251792257428
phase_eta  =  0.0948289950731
phi21  =  1.06457863439
phi31  =  2.37025613643
quartile31  =  0.4275
r21  =  0.524258157572
r31  =  0.358207083692
shapiro_w  =  0.927107095718
skewness  =  -0.587982900413
slope_per10  =  -0.199960452527
slope_per90  =  0.233282911563
stetson_k  =  0.791424583577
weighted_mean  =  15.329437114
weighted_std  =  0.274569525095
