-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.284760050006
cusum  =  0.191195428914
eta  =  0.424933940045
hl_amp_ratio  =  0.3707637775
kurtosis  =  -0.904615106154
n_points  =  223
period  =  0.548366680069
period_SNR  =  27.1010163366
period_log10FAP  =  -28.5014458423
period_uncertainty  =  0.000101762965289
phase_cusum  =  0.287973272726
phase_eta  =  0.0345136349974
phi21  =  -2.24645736673
phi31  =  -4.20633974025
quartile31  =  0.39
r21  =  0.500567599069
r31  =  0.352543921627
shapiro_w  =  0.90501755476
skewness  =  -0.606803114871
slope_per10  =  -0.162388147685
slope_per90  =  0.522914992785
stetson_k  =  0.780637297179
weighted_mean  =  13.7478535953
weighted_std  =  0.243527114647
