-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.473664532346
cusum  =  0.122866887576
eta  =  0.575305807505
hl_amp_ratio  =  0.259626131158
kurtosis  =  0.441889798634
n_points  =  190
period  =  0.497036601621
period_SNR  =  27.3471430707
period_log10FAP  =  -21.7842443701
period_uncertainty  =  0.000109569935462
phase_cusum  =  0.261656490981
phase_eta  =  0.255063900305
phi21  =  0.80027684055
phi31  =  -1.23641621447
quartile31  =  0.4875
r21  =  0.429302041787
r31  =  0.256872053769
shapiro_w  =  0.859337806702
skewness  =  -1.10897191673
slope_per10  =  -0.09253512444
slope_per90  =  0.260659776814
stetson_k  =  0.709725909698
weighted_mean  =  12.7878961749
weighted_std  =  0.35004246446
