-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.116737392379
cusum  =  0.227605257212
eta  =  0.621295144215
hl_amp_ratio  =  0.544224355493
kurtosis  =  -0.713432120051
n_points  =  135
period  =  0.561438600389
period_SNR  =  20.8797250897
period_log10FAP  =  -15.1321927798
period_uncertainty  =  0.000113826660965
phase_cusum  =  0.237888755823
phase_eta  =  0.261267614808
phi21  =  0.887712214919
phi31  =  2.67549338919
quartile31  =  0.165
r21  =  0.43455462235
r31  =  0.1882039925
shapiro_w  =  0.951994478703
skewness  =  -0.432438799336
slope_per10  =  -0.475000008009
slope_per90  =  0.536564872572
stetson_k  =  0.803572273906
weighted_mean  =  14.0944107744
weighted_std  =  0.0993410706801
