-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.290283690408
cusum  =  0.182796663353
eta  =  0.540756929893
hl_amp_ratio  =  0.657104938303
kurtosis  =  -1.31646459904
n_points  =  336
period  =  0.655637324303
period_SNR  =  45.042488764
period_log10FAP  =  -49.6565070836
period_uncertainty  =  0.000139487416633
phase_cusum  =  0.271486708186
phase_eta  =  0.0530839619315
phi21  =  0.948021600449
phi31  =  2.03570293966
quartile31  =  0.51
r21  =  0.496464272298
r31  =  0.300476348974
shapiro_w  =  0.922377228737
skewness  =  -0.270745006362
slope_per10  =  -0.170795443741
slope_per90  =  0.330300000496
stetson_k  =  0.840244723819
weighted_mean  =  14.1845725285
weighted_std  =  0.273436467734
