-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.355817430621
cusum  =  0.221319236159
eta  =  0.657827004783
hl_amp_ratio  =  0.462602674071
kurtosis  =  -0.0314140668258
n_points  =  185
period  =  0.570959804287
period_SNR  =  23.8823971401
period_log10FAP  =  -18.3102421322
period_uncertainty  =  0.00017100295003
phase_cusum  =  0.304484261958
phase_eta  =  0.430484484031
phi21  =  3.97570343595
phi31  =  5.15504654753
quartile31  =  0.34
r21  =  0.41606678815
r31  =  0.16056642072
shapiro_w  =  0.923261880875
skewness  =  -0.862792742567
slope_per10  =  -0.25330139609
slope_per90  =  0.171707910959
stetson_k  =  0.709797309071
weighted_mean  =  15.3420113498
weighted_std  =  0.281436961411
