-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.26622774121
cusum  =  0.101445675889
eta  =  0.532154740878
hl_amp_ratio  =  0.381519180921
kurtosis  =  -1.11057227776
n_points  =  247
period  =  0.57416232526
period_SNR  =  35.6068070143
period_log10FAP  =  -29.8281789839
period_uncertainty  =  0.000151135130972
phase_cusum  =  0.27912163621
phase_eta  =  0.0947380326153
phi21  =  4.07410501799
phi31  =  5.30398167906
quartile31  =  0.41
r21  =  0.509373528543
r31  =  0.376307509024
shapiro_w  =  0.908428311348
skewness  =  -0.478701459873
slope_per10  =  -0.250077546637
slope_per90  =  0.381737736454
stetson_k  =  0.776209956144
weighted_mean  =  13.9984819003
weighted_std  =  0.251027919988
