-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.84


######### Lightcurve features #########

amplitude  =  0.297652326032
cusum  =  0.158135808565
eta  =  0.648259515525
hl_amp_ratio  =  0.333160002684
kurtosis  =  -0.555117823588
n_points  =  281
period  =  0.740855641446
period_SNR  =  37.3139365399
period_log10FAP  =  -35.7948504411
period_uncertainty  =  0.00015183957848
phase_cusum  =  0.259220452794
phase_eta  =  0.259672082282
phi21  =  -2.3275999473
phi31  =  -1.36367268529
quartile31  =  0.34
r21  =  0.314936056765
r31  =  0.23419099657
shapiro_w  =  0.90459561348
skewness  =  -0.747916333605
slope_per10  =  -0.264249995817
slope_per90  =  0.334075028175
stetson_k  =  0.743170939875
weighted_mean  =  12.7433737589
weighted_std  =  0.239199484412
