-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.330390646414
cusum  =  0.105596230684
eta  =  0.655593446631
hl_amp_ratio  =  0.323399981127
kurtosis  =  -0.0832910192872
n_points  =  251
period  =  0.56471197618
period_SNR  =  34.670207977
period_log10FAP  =  -27.3709728527
period_uncertainty  =  0.000127944848266
phase_cusum  =  0.227049112097
phase_eta  =  0.268436271174
phi21  =  0.768906779694
phi31  =  1.84439147191
quartile31  =  0.34
r21  =  0.45981729183
r31  =  0.29594670995
shapiro_w  =  0.893692731857
skewness  =  -0.900399101601
slope_per10  =  -0.0985835858324
slope_per90  =  0.26655936681
stetson_k  =  0.723092361946
weighted_mean  =  13.7690356243
weighted_std  =  0.255062310219
