-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.68


######### Lightcurve features #########

amplitude  =  0.17236358532
cusum  =  0.244291317624
eta  =  0.493788900786
hl_amp_ratio  =  1.54265933554
kurtosis  =  -1.38862698087
n_points  =  165
period  =  0.813440418878
period_SNR  =  25.809204123
period_log10FAP  =  -23.0891202397
period_uncertainty  =  0.000235484072031
phase_cusum  =  0.312191273779
phase_eta  =  0.250207310745
phi21  =  -1.55122101697
phi31  =  -3.47594864821
quartile31  =  0.26
r21  =  0.315047853404
r31  =  0.120987272521
shapiro_w  =  0.921009123325
skewness  =  0.135299545602
slope_per10  =  -0.777000002563
slope_per90  =  0.743180985951
stetson_k  =  0.869751285943
weighted_mean  =  13.5875099292
weighted_std  =  0.139348642135
