-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.303555874701
cusum  =  0.144528050176
eta  =  0.705413042677
hl_amp_ratio  =  0.431409108436
kurtosis  =  -0.127829676682
n_points  =  250
period  =  0.483176539101
period_SNR  =  37.4159284194
period_log10FAP  =  -30.7816661134
period_uncertainty  =  0.000120439513988
phase_cusum  =  0.346925574416
phase_eta  =  0.207004734818
phi21  =  -2.07573312922
phi31  =  -1.29237822535
quartile31  =  0.34
r21  =  0.455927745588
r31  =  0.281700537391
shapiro_w  =  0.89460259676
skewness  =  -0.928934104145
slope_per10  =  -0.0984043644874
slope_per90  =  0.188784271129
stetson_k  =  0.726111022113
weighted_mean  =  15.4626300346
weighted_std  =  0.269310366462
