-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.325641080929
cusum  =  0.134060961737
eta  =  0.625585891094
hl_amp_ratio  =  0.463033115763
kurtosis  =  0.30791642468
n_points  =  169
period  =  0.543257797061
period_SNR  =  23.4643528668
period_log10FAP  =  -17.5753394963
period_uncertainty  =  0.00010322861984
phase_cusum  =  0.320131454672
phase_eta  =  0.247619058707
phi21  =  3.89678250499
phi31  =  4.8541498311
quartile31  =  0.31
r21  =  0.543678128689
r31  =  0.29623317884
shapiro_w  =  0.915355801582
skewness  =  -0.904164246255
slope_per10  =  -0.213245796668
slope_per90  =  0.282141080313
stetson_k  =  0.715873459976
weighted_mean  =  16.0270001323
weighted_std  =  0.238917827324
