-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.324551294982
cusum  =  0.15419612346
eta  =  0.557778014647
hl_amp_ratio  =  0.708752096787
kurtosis  =  -0.535634647295
n_points  =  238
period  =  0.575052804299
period_SNR  =  35.0206248419
period_log10FAP  =  -29.539130615
period_uncertainty  =  0.00015164895617
phase_cusum  =  0.21472775547
phase_eta  =  0.0520546361749
phi21  =  0.850511571826
phi31  =  1.76102217221
quartile31  =  0.3775
r21  =  0.443486600114
r31  =  0.297743815948
shapiro_w  =  0.917969763279
skewness  =  -0.663264761725
slope_per10  =  -0.195634818347
slope_per90  =  0.480803777648
stetson_k  =  0.8101117455
weighted_mean  =  14.2193590947
weighted_std  =  0.2533560566
