-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.73


######### Lightcurve features #########

amplitude  =  0.173124405828
cusum  =  0.161043926959
eta  =  0.680002716108
hl_amp_ratio  =  1.21067271625
kurtosis  =  -1.09618740158
n_points  =  186
period  =  0.829974664215
period_SNR  =  30.8033620674
period_log10FAP  =  -25.6852939911
period_uncertainty  =  0.000200767951341
phase_cusum  =  0.238524470332
phase_eta  =  0.195987202425
phi21  =  1.4965445011
phi31  =  2.42513600251
quartile31  =  0.255
r21  =  0.303253508128
r31  =  0.0850666513626
shapiro_w  =  0.963864088058
skewness  =  0.106905985394
slope_per10  =  -0.397665264761
slope_per90  =  0.395110290006
stetson_k  =  0.860500058394
weighted_mean  =  14.7444303797
weighted_std  =  0.139402832552
