-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_e
class_probability =  0.32


######### Lightcurve features #########

amplitude  =  0.106532407334
cusum  =  0.346344737569
eta  =  1.0020909651
hl_amp_ratio  =  0.915184579235
kurtosis  =  -0.580022752198
n_points  =  40
period  =  0.258008230868
period_SNR  =  8.51336959878
period_log10FAP  =  -0.987640743094
period_uncertainty  =  2.13344550901e-05
phase_cusum  =  0.222436921973
phase_eta  =  0.904807681626
phi21  =  1.57553989211
phi31  =  4.70060751804
quartile31  =  0.115
r21  =  0.166789534622
r31  =  0.199156347633
shapiro_w  =  0.972391664982
skewness  =  -0.265039461015
slope_per10  =  -0.664604392262
slope_per90  =  0.616589159555
stetson_k  =  0.784007666045
weighted_mean  =  12.305
weighted_std  =  0.0837316028057
