-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.183826153862
cusum  =  0.100431455161
eta  =  0.573733802759
hl_amp_ratio  =  1.1598767047
kurtosis  =  -0.597016284533
n_points  =  385
period  =  0.636434033729
period_SNR  =  41.2546693939
period_log10FAP  =  -42.3753280562
period_uncertainty  =  0.000115154167644
phase_cusum  =  0.232562202079
phase_eta  =  0.479018942269
phi21  =  1.78110059745
phi31  =  0.15251281838
quartile31  =  0.28
r21  =  0.416550406971
r31  =  0.257039493008
shapiro_w  =  0.987286686897
skewness  =  -0.138029533738
slope_per10  =  -0.117699731399
slope_per90  =  0.181109593494
stetson_k  =  0.83149327754
weighted_mean  =  12.3289400521
weighted_std  =  0.182585463996
