-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.4


######### Lightcurve features #########

amplitude  =  0.513196396565
cusum  =  0.337144720327
eta  =  0.19328148768
hl_amp_ratio  =  0.272471098441
kurtosis  =  -0.795518237045
n_points  =  260
period  =  1.00007152319
period_SNR  =  27.2798544993
period_log10FAP  =  -23.028235705
period_uncertainty  =  0.000277335440108
phase_cusum  =  0.257942171423
phase_eta  =  0.491965385673
phi21  =  3.14693518579
phi31  =  3.18687136685
quartile31  =  0.8425
r21  =  0.250361400545
r31  =  0.213065899927
shapiro_w  =  0.849906206131
skewness  =  -0.6079434158
slope_per10  =  -0.211459203226
slope_per90  =  0.240199994296
stetson_k  =  0.705470438582
weighted_mean  =  10.5325384615
weighted_std  =  0.445681520541
