-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.297555102116
cusum  =  0.158488701127
eta  =  0.610126368114
hl_amp_ratio  =  0.394067442373
kurtosis  =  -1.00049312468
n_points  =  299
period  =  0.629406796235
period_SNR  =  45.9695019654
period_log10FAP  =  -38.3418249355
period_uncertainty  =  0.000113064384517
phase_cusum  =  0.276893265101
phase_eta  =  0.246286690428
phi21  =  -2.47639676794
phi31  =  -4.58992659755
quartile31  =  0.445
r21  =  0.402875179009
r31  =  0.323047201291
shapiro_w  =  0.894144356251
skewness  =  -0.608539538052
slope_per10  =  -0.173889089747
slope_per90  =  0.166025977348
stetson_k  =  0.758380687145
weighted_mean  =  15.5296501197
weighted_std  =  0.276810442146
