-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.286905389514
cusum  =  0.0898019081771
eta  =  0.647183904658
hl_amp_ratio  =  0.659052986269
kurtosis  =  -0.883544954922
n_points  =  409
period  =  0.679320059995
period_SNR  =  46.6222726848
period_log10FAP  =  -51.7554206259
period_uncertainty  =  0.000130618382577
phase_cusum  =  0.246328110796
phase_eta  =  0.215408832766
phi21  =  1.12008420066
phi31  =  -0.761101166284
quartile31  =  0.4
r21  =  0.478325002264
r31  =  0.315840555827
shapiro_w  =  0.93618452549
skewness  =  -0.492309320713
slope_per10  =  -0.120833337617
slope_per90  =  0.225710093845
stetson_k  =  0.833133116814
weighted_mean  =  13.5346370873
weighted_std  =  0.25399316775
