-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.38


######### Lightcurve features #########

amplitude  =  0.315577980153
cusum  =  0.153806807363
eta  =  0.757131858811
hl_amp_ratio  =  0.840529617349
kurtosis  =  -0.67094291791
n_points  =  187
period  =  0.624914985792
period_SNR  =  21.2615479661
period_log10FAP  =  -16.0060251652
period_uncertainty  =  0.000136613352547
phase_cusum  =  0.243322084923
phase_eta  =  0.777733553693
phi21  =  -2.33250296811
phi31  =  -4.51072483426
quartile31  =  0.465
r21  =  0.235878882794
r31  =  0.211388306502
shapiro_w  =  0.943062067032
skewness  =  -0.515703437238
slope_per10  =  -0.177361248423
slope_per90  =  0.159923030264
stetson_k  =  0.830142065222
weighted_mean  =  15.4638605336
weighted_std  =  0.298791741506
