-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.187540187164
cusum  =  0.104121622448
eta  =  0.612362970781
hl_amp_ratio  =  0.638993536314
kurtosis  =  -1.00069490758
n_points  =  301
period  =  0.623893155046
period_SNR  =  48.3839024391
period_log10FAP  =  -42.9235638941
period_uncertainty  =  0.000199908818996
phase_cusum  =  0.247890966716
phase_eta  =  0.100540127674
phi21  =  -2.07583162796
phi31  =  -3.78073186303
quartile31  =  0.26
r21  =  0.470168812116
r31  =  0.269038708771
shapiro_w  =  0.958162426949
skewness  =  -0.266900181808
slope_per10  =  -0.262093336433
slope_per90  =  0.297072959113
stetson_k  =  0.846351803569
weighted_mean  =  14.9177380731
weighted_std  =  0.154352356012
