-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.209974999872
cusum  =  0.124759324334
eta  =  0.682295212351
hl_amp_ratio  =  0.682401343627
kurtosis  =  -0.795945377932
n_points  =  204
period  =  0.651081254571
period_SNR  =  30.4125556741
period_log10FAP  =  -25.8373007221
period_uncertainty  =  0.000242995201023
phase_cusum  =  0.221117041599
phase_eta  =  0.346106626646
phi21  =  1.29398017146
phi31  =  -0.548211394437
quartile31  =  0.25
r21  =  0.36354567899
r31  =  0.213058215731
shapiro_w  =  0.956317126751
skewness  =  -0.434433066175
slope_per10  =  -0.247775891267
slope_per90  =  0.252043749297
stetson_k  =  0.824131927808
weighted_mean  =  14.1085215991
weighted_std  =  0.168405816286
