-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.298659163244
cusum  =  0.120493883034
eta  =  0.597209048083
hl_amp_ratio  =  0.670073342598
kurtosis  =  -0.897075062013
n_points  =  598
period  =  0.675584626087
period_SNR  =  65.2338781228
period_log10FAP  =  -78.9854659866
period_uncertainty  =  0.000146866230003
phase_cusum  =  0.261342343933
phase_eta  =  0.116933705047
phi21  =  -2.20664018834
phi31  =  -3.98399982069
quartile31  =  0.4075
r21  =  0.550724419376
r31  =  0.306034315106
shapiro_w  =  0.957269906998
skewness  =  -0.361647862046
slope_per10  =  -0.100145311492
slope_per90  =  0.100410690838
stetson_k  =  0.803624718945
weighted_mean  =  15.6300841664
weighted_std  =  0.255517477379
