-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.459642255514
cusum  =  0.152719337382
eta  =  0.648426917341
hl_amp_ratio  =  0.36310607881
kurtosis  =  -0.0682141915683
n_points  =  187
period  =  0.611896852394
period_SNR  =  24.3248513966
period_log10FAP  =  -19.5427660568
period_uncertainty  =  0.000109142564048
phase_cusum  =  0.255688929846
phase_eta  =  0.364929192032
phi21  =  3.91308103865
phi31  =  4.83058250903
quartile31  =  0.445
r21  =  0.465165572296
r31  =  0.306545773608
shapiro_w  =  0.89033895731
skewness  =  -0.954314940753
slope_per10  =  -0.118429856607
slope_per90  =  0.314649390734
stetson_k  =  0.720783421415
weighted_mean  =  12.6640312368
weighted_std  =  0.355241086845
