-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.267455040058
cusum  =  0.108431475186
eta  =  0.494021540015
hl_amp_ratio  =  0.255344250759
kurtosis  =  -0.312163760877
n_points  =  368
period  =  0.584965548375
period_SNR  =  45.7245839396
period_log10FAP  =  -47.7125297009
period_uncertainty  =  0.000110107711589
phase_cusum  =  0.236149726918
phase_eta  =  0.3514485083
phi21  =  -2.26424929509
phi31  =  -4.32539385531
quartile31  =  0.31
r21  =  0.435188528444
r31  =  0.262534210525
shapiro_w  =  0.885525643826
skewness  =  -0.887090013716
slope_per10  =  -0.139691191918
slope_per90  =  0.241292320821
stetson_k  =  0.694933215803
weighted_mean  =  14.2425090336
weighted_std  =  0.226813901941
