-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.59


######### Lightcurve features #########

amplitude  =  0.279241485781
cusum  =  0.186042733712
eta  =  0.638620207322
hl_amp_ratio  =  0.564326793858
kurtosis  =  -0.844538527536
n_points  =  214
period  =  0.578905108696
period_SNR  =  20.963640729
period_log10FAP  =  -16.9457652833
period_uncertainty  =  0.000132646020772
phase_cusum  =  0.239276735814
phase_eta  =  0.752553903656
phi21  =  -3.649777507
phi31  =  -2.75818645134
quartile31  =  0.47
r21  =  0.156107391979
r31  =  0.155206493022
shapiro_w  =  0.955797731876
skewness  =  -0.416550479365
slope_per10  =  -0.10427155176
slope_per90  =  0.0891906512225
stetson_k  =  0.803565827327
weighted_mean  =  16.5582127098
weighted_std  =  0.280881497511
