-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.307361155895
cusum  =  0.109291740523
eta  =  0.451031637994
hl_amp_ratio  =  0.429799414223
kurtosis  =  -1.01336801381
n_points  =  351
period  =  0.613709875727
period_SNR  =  40.8532485596
period_log10FAP  =  -44.4985851317
period_uncertainty  =  0.000102517354698
phase_cusum  =  0.233133366244
phase_eta  =  0.254464664925
phi21  =  4.0305254111
phi31  =  5.09905488614
quartile31  =  0.5
r21  =  0.503126807884
r31  =  0.274025358611
shapiro_w  =  0.909588217735
skewness  =  -0.56162807665
slope_per10  =  -0.082686900376
slope_per90  =  0.219090587898
stetson_k  =  0.786116128723
weighted_mean  =  13.7672362291
weighted_std  =  0.285574369601
