-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.362652010848
cusum  =  0.16430857302
eta  =  0.840697958242
hl_amp_ratio  =  0.237959628054
kurtosis  =  1.77149312467
n_points  =  172
period  =  0.497180154454
period_SNR  =  27.7746854877
period_log10FAP  =  -16.677639198
period_uncertainty  =  0.000117224917269
phase_cusum  =  0.286477909268
phase_eta  =  0.122864855684
phi21  =  -2.49782583158
phi31  =  -1.54400613257
quartile31  =  0.27
r21  =  0.4553405079
r31  =  0.318958601425
shapiro_w  =  0.850138604641
skewness  =  -1.44520650219
slope_per10  =  -0.196064800968
slope_per90  =  0.23660323801
stetson_k  =  0.620090391903
weighted_mean  =  15.0560057882
weighted_std  =  0.243282574028
