-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.277197457544
cusum  =  0.116095318225
eta  =  0.545181649224
hl_amp_ratio  =  0.491779600967
kurtosis  =  -0.606635664435
n_points  =  347
period  =  0.689356060234
period_SNR  =  42.3075863483
period_log10FAP  =  -48.0231209383
period_uncertainty  =  0.000132395345442
phase_cusum  =  0.224523088318
phase_eta  =  0.0387873560206
phi21  =  1.05889699794
phi31  =  2.22532282102
quartile31  =  0.325
r21  =  0.498361174282
r31  =  0.29669079353
shapiro_w  =  0.937462449074
skewness  =  -0.626671420654
slope_per10  =  -0.187987093191
slope_per90  =  0.352850646393
stetson_k  =  0.777643307076
weighted_mean  =  14.9431771159
weighted_std  =  0.234008151528
