-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.81


######### Lightcurve features #########

amplitude  =  0.234817941668
cusum  =  0.184833975467
eta  =  0.809973631965
hl_amp_ratio  =  0.763308284391
kurtosis  =  -0.974035877334
n_points  =  94
period  =  0.602645859027
period_SNR  =  18.1213231999
period_log10FAP  =  -10.7223613492
period_uncertainty  =  0.000131582071312
phase_cusum  =  0.309299733568
phase_eta  =  0.314336687148
phi21  =  1.32040291895
phi31  =  2.7259942666
quartile31  =  0.315
r21  =  0.345681013785
r31  =  0.117498058567
shapiro_w  =  0.957126438618
skewness  =  -0.244358749469
slope_per10  =  -0.393980716596
slope_per90  =  0.982300015166
stetson_k  =  0.856582303037
weighted_mean  =  14.3850146628
weighted_std  =  0.1905642565
