-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.267976156831
cusum  =  0.164691575817
eta  =  0.620166688546
hl_amp_ratio  =  0.606595025402
kurtosis  =  -1.14472332232
n_points  =  254
period  =  0.620873817505
period_SNR  =  33.1919712098
period_log10FAP  =  -31.5347279558
period_uncertainty  =  0.000128465517088
phase_cusum  =  0.232251062064
phase_eta  =  0.0945212018709
phi21  =  1.17050807797
phi31  =  -0.591827845791
quartile31  =  0.41
r21  =  0.503818557427
r31  =  0.33948006597
shapiro_w  =  0.944480240345
skewness  =  -0.282791528884
slope_per10  =  -0.136632790779
slope_per90  =  0.406097031842
stetson_k  =  0.848298193612
weighted_mean  =  13.3436180855
weighted_std  =  0.238765095798
