-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.291994588467
cusum  =  0.126532735802
eta  =  0.749082152075
hl_amp_ratio  =  0.504287935898
kurtosis  =  0.406697036697
n_points  =  307
period  =  0.6120882878
period_SNR  =  37.7738656928
period_log10FAP  =  -32.3855632365
period_uncertainty  =  0.000106383534752
phase_cusum  =  0.196727363428
phase_eta  =  0.437343065045
phi21  =  0.813410508168
phi31  =  1.65844019883
quartile31  =  0.305
r21  =  0.426826934174
r31  =  0.237013080432
shapiro_w  =  0.952953338623
skewness  =  -0.686943595309
slope_per10  =  -0.0817081168249
slope_per90  =  0.112852819157
stetson_k  =  0.714855346208
weighted_mean  =  17.9636757216
weighted_std  =  0.246579889684
