-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.339320892446
cusum  =  0.156858568461
eta  =  0.621695483499
hl_amp_ratio  =  0.245648205467
kurtosis  =  -0.173894534878
n_points  =  212
period  =  0.519516517001
period_SNR  =  31.6277025817
period_log10FAP  =  -25.0218869436
period_uncertainty  =  0.000108284176208
phase_cusum  =  0.242388628997
phase_eta  =  0.298029641637
phi21  =  3.90076758875
phi31  =  4.95628798925
quartile31  =  0.35
r21  =  0.435079067836
r31  =  0.258615632635
shapiro_w  =  0.861974835396
skewness  =  -1.00899756712
slope_per10  =  -0.16165857821
slope_per90  =  0.178374165313
stetson_k  =  0.654639194599
weighted_mean  =  16.4134363496
weighted_std  =  0.30675442489
