-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.251106789026
cusum  =  0.149176492678
eta  =  0.478180200628
hl_amp_ratio  =  0.676122786635
kurtosis  =  -0.622723784618
n_points  =  267
period  =  0.610510016478
period_SNR  =  31.1713262047
period_log10FAP  =  -29.3900759816
period_uncertainty  =  0.000104783405489
phase_cusum  =  0.22702579501
phase_eta  =  0.549988751085
phi21  =  -2.25594828464
phi31  =  -1.14021390693
quartile31  =  0.4
r21  =  0.380522516842
r31  =  0.251190851543
shapiro_w  =  0.945366084576
skewness  =  -0.55121020441
slope_per10  =  -0.218024347168
slope_per90  =  0.318712569664
stetson_k  =  0.802466054531
weighted_mean  =  14.5070609065
weighted_std  =  0.252726636238
