-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.31355846894
cusum  =  0.160619329278
eta  =  0.520818418786
hl_amp_ratio  =  0.669265592325
kurtosis  =  -1.0950293036
n_points  =  288
period  =  0.585880573836
period_SNR  =  40.5802487674
period_log10FAP  =  -35.6790948327
period_uncertainty  =  0.000156778326276
phase_cusum  =  0.256740109751
phase_eta  =  0.0566106976941
phi21  =  -1.89582226316
phi31  =  -0.442958772405
quartile31  =  0.4425
r21  =  0.500282422326
r31  =  0.337753178193
shapiro_w  =  0.944005966187
skewness  =  -0.304895886789
slope_per10  =  -0.181741739469
slope_per90  =  0.276468985298
stetson_k  =  0.845756676404
weighted_mean  =  14.062698736
weighted_std  =  0.277539770564
