-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.26


######### Lightcurve features #########

amplitude  =  0.526610084993
cusum  =  0.338037331233
eta  =  0.496018721926
hl_amp_ratio  =  1.12795308593
kurtosis  =  -1.37558152056
n_points  =  42
period  =  0.193472583805
period_SNR  =  8.54554376736
period_log10FAP  =  -2.80835340232
period_uncertainty  =  1.28938743529e-05
phase_cusum  =  0.345436136292
phase_eta  =  0.413168117381
phi21  =  2.57953601189
phi31  =  3.34113223167
quartile31  =  0.685
r21  =  0.077063840051
r31  =  0.0387853824265
shapiro_w  =  0.9316188097
skewness  =  0.0536310906449
slope_per10  =  -0.0885079525321
slope_per90  =  0.231900003273
stetson_k  =  0.893670033065
weighted_mean  =  15.0934129693
weighted_std  =  0.367271960457
