-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.376910961562
cusum  =  0.121544607909
eta  =  0.627080020949
hl_amp_ratio  =  0.443617705847
kurtosis  =  -0.782904960556
n_points  =  291
period  =  0.637290392503
period_SNR  =  42.3309299855
period_log10FAP  =  -34.8934324691
period_uncertainty  =  0.000117114527559
phase_cusum  =  0.267536512771
phase_eta  =  0.0765987318984
phi21  =  -1.92737464616
phi31  =  -3.86406904106
quartile31  =  0.48
r21  =  0.549310866725
r31  =  0.377859563618
shapiro_w  =  0.914233148098
skewness  =  -0.629747963238
slope_per10  =  -0.150815019069
slope_per90  =  0.366523961995
stetson_k  =  0.762378921927
weighted_mean  =  12.6727471807
weighted_std  =  0.346654657185
