-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_ED
class_probability =  0.32


######### Lightcurve features #########

amplitude  =  0.22611815991
cusum  =  0.743725562457
eta  =  1.11394265481
hl_amp_ratio  =  0.655758094328
kurtosis  =  -0.42882105514
n_points  =  12
period  =  1.60926510015
period_SNR  =  4.80112172481
period_log10FAP  =  0.0
period_uncertainty  =  0.00117981368668
phase_cusum  =  0.579789300572
phase_eta  =  2.59903780568
phi21  =  -1.53342386741
phi31  =  0.508699257122
quartile31  =  0.1875
r21  =  0.424691069001
r31  =  0.6876501477
shapiro_w  =  0.88193154335
skewness  =  0.720745061184
slope_per10  =  -2.12900000624
slope_per90  =  1.66839892924
stetson_k  =  0.7696574966
weighted_mean  =  13.7497621407
weighted_std  =  0.136885731841
