-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.417782832282
cusum  =  0.144534681179
eta  =  0.547546418829
hl_amp_ratio  =  0.648058722167
kurtosis  =  -0.873992848196
n_points  =  294
period  =  0.482074550506
period_SNR  =  40.0485554133
period_log10FAP  =  -35.2070084768
period_uncertainty  =  0.000120525340919
phase_cusum  =  0.256338395263
phase_eta  =  0.326058989709
phi21  =  1.09643282826
phi31  =  -0.914323759887
quartile31  =  0.5775
r21  =  0.39344627204
r31  =  0.170918891104
shapiro_w  =  0.941563725471
skewness  =  -0.480889853679
slope_per10  =  -0.0967904211206
slope_per90  =  0.108831742318
stetson_k  =  0.829627775942
weighted_mean  =  11.7389668169
weighted_std  =  0.374622297463
