<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.318342996229
cusum  =  0.0990163555092
eta  =  0.673073677828
hl_amp_ratio  =  0.510716786348
kurtosis  =  -0.590351931567
n_points  =  372
period  =  0.552100848552
period_SNR  =  43.0357293606
period_log10FAP  =  -44.5573521094
period_uncertainty  =  8.48759164121e-05
phase_cusum  =  0.23594367117
phase_eta  =  0.169814002146
phi21  =  3.98557086518
phi31  =  5.17088094667
quartile31  =  0.38
r21  =  0.509255927209
r31  =  0.352958610941
shapiro_w  =  0.937892496586
skewness  =  -0.624908795353
slope_per10  =  -0.0916852636882
slope_per90  =  0.167350014672
stetson_k  =  0.752675623256
weighted_mean  =  16.8386004079
weighted_std  =  0.26845614777
</pre></body></html>