-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.282595649564
cusum  =  0.0715074601175
eta  =  0.605043226913
hl_amp_ratio  =  0.406369871066
kurtosis  =  -0.405842459459
n_points  =  631
period  =  0.639161529469
period_SNR  =  56.3950065824
period_log10FAP  =  -95.1916193966
period_uncertainty  =  0.000111197207383
phase_cusum  =  0.251825199804
phase_eta  =  0.211252537934
phi21  =  -2.40071058024
phi31  =  -1.27004416631
quartile31  =  0.37
r21  =  0.362868756111
r31  =  0.188391060275
shapiro_w  =  0.919334352016
skewness  =  -0.755746470666
slope_per10  =  -0.0648250116501
slope_per90  =  0.0647967354652
stetson_k  =  0.774915892389
weighted_mean  =  15.1435762078
weighted_std  =  0.226724302923
