-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.23007724179
cusum  =  0.117054964932
eta  =  0.561215888581
hl_amp_ratio  =  0.632882994403
kurtosis  =  -0.846943683215
n_points  =  359
period  =  0.561708859284
period_SNR  =  48.7544922196
period_log10FAP  =  -43.5990998215
period_uncertainty  =  0.000107930995969
phase_cusum  =  0.256642327423
phase_eta  =  0.340608297337
phi21  =  1.15766722921
phi31  =  2.52823480225
quartile31  =  0.295
r21  =  0.486259218315
r31  =  0.264727758986
shapiro_w  =  0.963993132114
skewness  =  -0.33928478247
slope_per10  =  -0.145461804876
slope_per90  =  0.174969093944
stetson_k  =  0.813838188658
weighted_mean  =  14.6706296638
weighted_std  =  0.190778494291
