-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.18385959525
cusum  =  0.209199432346
eta  =  0.605440729032
hl_amp_ratio  =  0.629447834523
kurtosis  =  -0.657765455915
n_points  =  176
period  =  0.66627168273
period_SNR  =  27.3532277858
period_log10FAP  =  -20.4064238347
period_uncertainty  =  0.000184271120911
phase_cusum  =  0.256754985586
phase_eta  =  0.397956853636
phi21  =  3.7987218344
phi31  =  5.02283202334
quartile31  =  0.27
r21  =  0.317100526543
r31  =  0.309963549342
shapiro_w  =  0.960101604462
skewness  =  -0.406504164732
slope_per10  =  -0.270942044733
slope_per90  =  0.297099989839
stetson_k  =  0.788652881853
weighted_mean  =  15.4089891762
weighted_std  =  0.16717796305
