-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.19


######### Lightcurve features #########

amplitude  =  0.595962380003
cusum  =  0.364825486004
eta  =  2.48067209268
hl_amp_ratio  =  1.0163066866
kurtosis  =  -0.467263846846
n_points  =  12
period  =  0.720352793205
period_SNR  =  4.89712289186
period_log10FAP  =  0.0
period_uncertainty  =  0.000313913452776
phase_cusum  =  0.483579913171
phase_eta  =  1.03753412297
phi21  =  0.989546708961
phi31  =  2.59107477425
quartile31  =  0.4
r21  =  0.0573797844961
r31  =  0.0751618088318
shapiro_w  =  0.945903003216
skewness  =  -0.346194137522
slope_per10  =  -1.24499998055
slope_per90  =  0.22676559208
stetson_k  =  0.802214976311
weighted_mean  =  15.4222411175
weighted_std  =  0.265203404197
